1000 1500 2000 2500 3000 3500 4000 4500 0 0.5 1 1.5 2 2.5 x 10^4

Absolute intensity difference m/z

1000 1500 2000 2500 3000 3500 4000 4500 0

5

10

15

Percentage of occurence (%) m/z