1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 0

10

20

30

Absolute intensity difference m/z

1000 2000 3000 4000 5000 6000 7000 8000 9000 10000 0 2 4 6 8 10 12

Percentage of occurrence (%) m/z